From b1d0383c31cc936710fb9099f6d9e86e7eeae569 Mon Sep 17 00:00:00 2001
From: Thomas Grill <xovo@users.sourceforge.net>
Date: Wed, 5 Jan 2005 05:04:55 +0000
Subject: made default configurations generic two more flext tutorials fixes
 for Max headers cleanups updated build system updated tutorials revised the
 documentation updated for OSX upgraded version number

svn path=/trunk/; revision=2465
---
 externals/grill/flext/buildsys/mac/pd/config-gcc.def | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'externals/grill/flext/buildsys/mac/pd/config-gcc.def')

diff --git a/externals/grill/flext/buildsys/mac/pd/config-gcc.def b/externals/grill/flext/buildsys/mac/pd/config-gcc.def
index 85a9d8bd..19198e92 100644
--- a/externals/grill/flext/buildsys/mac/pd/config-gcc.def
+++ b/externals/grill/flext/buildsys/mac/pd/config-gcc.def
@@ -1,5 +1,5 @@
 # where is the PD installation including source code?
-PDPATH=/Applications/audio/Pd-0.38-0test13.app/Contents/Resources
+PDPATH=/Applications/audio/Pd-0.38-0.app/Contents/Resources
 
 # where is the PD executable?
 PDBIN=$(PDPATH)/bin/pd
@@ -27,4 +27,6 @@ INSTPATH=$(PDPATH)/extra
 
 # user defined compiler flags
 # (check if they match your system!)
-OFLAGS=-O2 -mcpu=G4 -malign-natural -maltivec -faltivec
+OFLAGS=-O2
+# optimizations for G4
+#OFLAGS += -mcpu=G4 -malign-natural -maltivec -faltivec
-- 
cgit v1.2.1

