From 0ed7a8b68dd73e2b0473b8127aeca99f3bac9061 Mon Sep 17 00:00:00 2001
From: Thomas Grill <xovo@users.sourceforge.net>
Date: Wed, 1 Apr 2009 21:13:09 +0000
Subject: cleaned up grill externals - replaced with svn:externals to
 svn.grrrr.org/ext/trunk/

svn path=/trunk/; revision=10951
---
 .../grill/flext/buildsys/win/pd/config-bcc.def     | 38 ----------------------
 1 file changed, 38 deletions(-)
 delete mode 100644 externals/grill/flext/buildsys/win/pd/config-bcc.def

(limited to 'externals/grill/flext/buildsys/win/pd/config-bcc.def')

diff --git a/externals/grill/flext/buildsys/win/pd/config-bcc.def b/externals/grill/flext/buildsys/win/pd/config-bcc.def
deleted file mode 100644
index 54e8397d..00000000
--- a/externals/grill/flext/buildsys/win/pd/config-bcc.def
+++ /dev/null
@@ -1,38 +0,0 @@
-# where is the PD installation?
-# (this should point to the main folder, which has a "src" subfolder)
-PDPATH="c:\program files\pd"
-
-# where is BorlandC++?
-BCCPATH="c:\program files\bcc55"
-
-###############################################################
-
-# where do/should the flext headers reside/be built?
-FLEXTINC=$(PDPATH)\flext
-
-# where do/should the flext static libraries reside/be built?
-FLEXTLIB=$(FLEXTINC)
-
-# where do/should the flext shared libraries reside/be built?
-FLEXTSHLIB=$(PDPATH)\bin
-
-###############################################################
-
-# where should the external be built?
-OUTPATH=pd-bcc
-
-# where should the external be installed?
-INSTPATH=$(PDPATH)\extra
-
-###############################################################
-
-# user defined compiler flags
-# (check if they match your system!)
-UFLAGS=
-
-# user defined optimization flags
-# (check if they match your system!)
-OFLAGS=-6 -O2 -OS -ff -d
-
-# comment if you want to compile for Windows 95/98/ME
-WINNT=1
-- 
cgit v1.2.1

