# where is the PD source package?
PDPATH=/usr/local/src/pd-0.38-0test10

# where should the external be installed?
INSTPATH=/usr/local/lib/pd/extra

# where do the flext headers and libraries reside?
FLEXTPATH=/usr/local/lib/pd/flext

# where should the external be built?
OUTPATH=pd-linux

# user defined compiler flags
# (check if they match your system!)
OFLAGS=-O2 -march=pentium4 -msse
