# where is PD?
PDPATH=c:/programme/audio/pd

# where should the external be installed?
INSTPATH=$(PDPATH)/extra

# where do the flext headers and libraries reside?
FLEXTPATH=$(PDPATH)/flext

# where should the external be built?
OUTPATH=pd-mingw

# user defined compiler flags
# (check if they match your system!)
OFLAGS=-O2 -march=pentium4 -msse
