# where is the PD source package?
PDPATH=/usr/local/src/pd

###############################################################

# where do/should the flext headers reside/be built?
FLEXTINC=/usr/local/include/flext

# where do/should the flext static libraries reside/be built?
FLEXTLIB=/usr/local/lib

# where do/should the flext shared libraries reside/be built?
FLEXTSHLIB=$(FLEXTLIB)

###############################################################

# where should the external be built?
OUTPATH=pd-linux

# where should the external be installed?
INSTPATH=/usr/local/lib/pd/extra

###############################################################

# user defined compiler flags
# (check if they match your system!)
OFLAGS=-O2
# optimizations for Pentium 4
#OFLAGS+=-march=pentium4 -msse
