# where are the Max/MSP SDK header files?
# you should have the latest version!
MAXSDKPATH="c:/data/prog/audio/maxmspsdk_win/4.5 headers/c74support"

# where should the external be installed?
INSTPATH="%CommonProgramFiles%/Cycling '74/externals/flext"

# where do the flext headers and libraries reside?
FLEXTPATH="%CommonProgramFiles%/Cycling '74/flext"

# where should the external be built?
# (path for temporary files)
OUTPATH=max-mingw

# some user-definable flags
# (check if they match your system!)
OFLAGS=-O2 -march=pentium4 -msse
