# where are the Max/MSP SDK header files?
# you should have the latest version!
MAXSDKPATH="%ProgramFiles%\MaxMSP 4.5/maxmspsdk_win/4.5 headers/c74support"

###############################################################

# where do/should the flext headers reside/be built?
FLEXTINC="%CommonProgramFiles%/Cycling '74/flext"

# where do/should the flext static libraries reside/be built?
FLEXTLIB=$(FLEXTINC)

# where do/should the flext shared libraries reside/be built?
# (a good place is the MaxMSP program folder)
FLEXTSHLIB="%ProgramFiles%\MaxMSP 4.5"

###############################################################

# where should the external be built?
# (path for temporary files)
OUTPATH=max-mingw

# where should the external be installed?
INSTPATH="%CommonProgramFiles%/Cycling '74/externals/flext"

# where should the initialization files be installed?
INITPATH="%CommonProgramFiles%/Cycling '74/init"

# where should the help files be installed?
HELPPATH="%ProgramFiles%/MaxMSP 4.5/max-help/flext"

###############################################################

# some user-definable flags
# (check if they match your system!)
OFLAGS=-O2 
# optimizations for Pentium 4
#OFLAGS += -march=pentium4 -msse
