# where are the Max/MSP SDK header files?
# you should have the latest version!
MAXSDKPATH="c:\data\prog\audio\maxmspsdk_win\4.5 headers\c74support"	

# where should the external be installed?
INSTPATH="%CommonProgramFiles%\Cycling '74\externals\flext"

# where do the flext headers and libraries reside?
FLEXTPATH="%CommonProgramFiles%\Cycling '74\flext"

# where should the external be built?
# (path for temporary files)
OUTPATH=max-msvc

# some user-definable flags
# (check if they match your system!)
OFLAGS=/G6 /Ox /arch:SSE
