# where is PD?
PDPATH="c:\program files\pd"

# where is BorlandC++?
BCCPATH="c:\program files\bcc55"

###############################################################

# where do/should the flext headers reside/be built?
FLEXTINC=$(PDPATH)\flext

# where do/should the flext static libraries reside/be built?
FLEXTLIB=$(FLEXTINC)

# where do/should the flext shared libraries reside/be built?
FLEXTSHLIB=$(PDPATH)\bin

###############################################################

# where should the external be built?
OUTPATH=pd-bcc

# where should the external be installed?
INSTPATH=$(PDPATH)\extra

###############################################################

# user defined compiler flags
# (check if they match your system!)
OFLAGS=-6 -O2 -OS -ff -d
