# where is PD?
PDPATH=/cygdrive/c/programme/audio/pd

###############################################################

# where do/should the flext headers reside/be built?
FLEXTINC=$(PDPATH)/flext

# where do/should the flext static libraries reside/be built?
FLEXTLIB=$(FLEXTINC)

# where do/should the flext shared libraries reside/be built?
FLEXTSHLIB=$(FLEXTINC)

###############################################################

# where should the external be built?
OUTPATH=pd-cygwin

# where should the external be installed?
INSTPATH=$(PDPATH)/extra

###############################################################

# user defined compiler flags
# (check if they match your system!)
OFLAGS=-O2 -march=pentium4 -msse
