# where is the PD installation?
# (this should point to the main folder, which has a "src" subfolder)
PDPATH="%ProgramFiles%\pd"

###############################################################

# where do/should the flext headers reside/be built?
FLEXTINC=$(PDPATH)\flext

# where do/should the flext static libraries reside/be built?
FLEXTLIB=$(FLEXTINC)

# where do/should the flext shared libraries reside/be built?
FLEXTSHLIB=$(PDPATH)\bin

###############################################################

# where should the external be built?
OUTPATH=pd-mingw

# where should the external be installed?
INSTPATH=$(PDPATH)\extra

###############################################################

# user defined compiler flags
# (check if they match your system!)
UFLAGS=-msse -mfpmath=sse -ffast-math

# user defined optimization flags
# (check if they match your system!)
OFLAGS=-O3
# optimizations for Pentium 4
OFLAGS+=-march=pentium4 
