<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;"># where is the PD installation?
# (this should point to the main folder, which has a "src" subfolder)
PDPATH="%ProgramFiles%\pd"

# where is MS VC++?
# (not necessary if the build is run with the compiler environment)
# MSVCPATH="%ProgramFiles%\Microsoft Visual Studio .NET 2003\Vc7"

###############################################################

# where do/should the flext headers reside/be built?
FLEXTINC=$(PDPATH)\flext

# where do/should the flext static libraries reside/be built?
FLEXTLIB=$(FLEXTINC)

# where do/should the flext shared libraries reside/be built?
FLEXTSHLIB=$(PDPATH)\bin

###############################################################

# where should the external be built?
# (relative one-level subpath to project folder)
OUTPATH=pd-msvc

# where should externals be installed?
INSTPATH=$(PDPATH)\extra

###############################################################

# user defined compiler flags
# (check if they match your system!)
UFLAGS=

# user defined optimization flags
# (check if they match your system!)
OFLAGS=/Ox
# optimizations for Pentium 4
OFLAGS=$(OFLAGS) /G6 /arch:SSE

# comment if you want to compile for Windows 95/98/ME
WINNT=1

# uncomment to link against dynamic C runtime libraries
# (don't use this if you want to distribute the built product)
#DYNAMIC=1
</pre></body></html>